169.5 pb^{−1}

133.5 pb^{−1}

H1 performance in 1996-2000

HERA delivered L H1 total L H1 physics L

Efficiency

operational overall

Mean Dead Time

all lumi runs physics runs

Number of H1 runs per fill

Average H1 Run Time

Lumi Run number

L [pb^{−1}] t [min]