Days since 1-Jan-2007

Integrated

Luminosity

/pb-1

HERA low E_p run Status: 1-July-2007

80 100 120 140 160 180 0

5

10

15

20

25 HERA deliv: 460 GeV 575 GeV H1 physics: 460 GeV 575 GeV