HERA performance in 2000

Integrated Luminosity

total L physics L

Beam Currents I(e) I(p)

Luminosity

peak L mean L

Specific Luminosity

peak L_{sp} mean L_{sp}

Lumi Life Time

Lumi Run number

19-Jan 24-Aug

L [pb^{−1}]

[mA] [10^{30}cm^{−2}s^{−1}]

[10^{30}cm^{−2}s^{−1}mA^{−2}] τ [hour]