10 20 30 40 0

0.5

1

1.5

I(e)/mA

<HVOK>

TP=1-4 1999 e- e+

10 20 30 0

0.5

1

1.5

I(e)/mA

TP=2-4 1999 e- e+

0 5000 10000 15000 0

0.5

1

1.5

Run-Run_0

TP=1-4 25<Ie<35

0 5000 10000 15000 0

0.5

1

1.5

Run-Run_0

TP=2-4 25<Ie<35

0 10 20 30 40 50 0

0.02

0.04

0.06

0.08

I(e)/mA

TP=1-4

40 60 80 100 120 0

0.02

0.04

0.06

I(p)/mA

TP=1-4 e- e+