10 20 30 0

0.5

1

1.5

I(e)/mA

<HVOK>

G+M runs e- e+ (94-97) e+ (99)

20 40 60 80 100 0

0.5

1

1.5

I(p)/mA

G+M runs e- e+ (94-97) e+ (99)