HERA Total 64.761 pb-1 HERA Deliver 60.981 pb-1 H1 Runs 54.938 pb-1 H1 On Tape 49.739 pb-1

Integr. Lumi pb-1

Status 24.08.00

February March April May June July August

Lumi per day nb-1 H1 Total eff H1 Dead time

Day of the year 2000

0 20 40 60

25 50 75 100 125 150 175 200 225

0 200 400 600

25 50 75 100 125 150 175 200 225

0 0.2 0.4 0.6 0.8

25 50 75 100 125 150 175 200 225

0 0.25 0.5 0.75 1

25 50 75 100 125 150 175 200 225