0 10 20 30 40 50 60 70 80 90

25 50 75 100 125 150 175 200

H1 LUMI Online 2004(e^+)

HERA Delivered 86.62 pb^{-1} H1 Gated 82.28 pb^{-1} H1 Data Taken 74.40 pb^{-1}

Integr. Lumi pb^{-1}

Status 13.08.04 at 14:00

January February March April May June July August

Lumi per day nb^{-1}

Day of the year 2004 0

200

400

600

800

1000

1200

25 50 75 100 125 150 175 200