0 25 50 75 100 125 150 175 200 225

50 100 150 200 250 300

HERA Delivered 226.45 pb^{-1} H1 Gated 214.73 pb^{-1} H1 Data Taken 195.25 pb^{-1}

Integr. Lumi pb^{-1}

Status 14.11.05 at 11:00

Dec Jan Febr March April May June July Aug Sept Oct Nov

Lumi per day nb^{-1}

Days of running since 5.12.04 0 250 500 750 1000

1250

1500

1750

2000

50 100 150 200 250 300