0 10 20 30 40 50 60 70 80 90

20 40 60 80 100 120 140 160 180

HERA Delivered 88.63 pb^{-1} H1 Gated 84.93 pb^{-1} H1 Data Taken 76.64 pb^{-1}

Integr. Lumi pb^{-1}

Status 30.06.07 at 23:30

January February March April May June

Lumi per day nb^{-1}

Day of the year 2007 0 200 400 600 800 1000

1200

1400

1600

1800

20 40 60 80 100 120 140 160 180