0 25 50 75 100 125 150 175 200 225

50 100 150 200 250 300 350

HERA Delivered 210.79 pb^{-1} H1 Gated 196.31 pb^{-1} H1 Data Taken 176.36 pb^{-1}

Integr. Lumi pb^{-1}

Status 05.01.07 at 16:00

March April May June July August Sept Oct Nov Dec

Lumi per day nb^{-1}

Day of the year 2006 0 200 400 600 800 1000

1200

1400

1600

50 100 150 200 250 300 350