0 10 20 30 40 50 60 70 80 90

60 80 100 120 140 160

HERA Delivered 89.53 pb^{-1} H1 Gated 82.82 pb^{-1} H1 Data Taken 74.35 pb^{-1}

Integr. Lumi pb^{-1}

Status 26.06.06 at 12:00

February March April May June

Lumi per day nb^{-1}

Day of the year 2006 0 250 500 750 1000

1250

1500

1750

2000

60 80 100 120 140 160