0

20

40

60

80

100

120

200 220 240 260 280 300 320 340 360

HERA Delivered 121.26 pb^{-1} H1 Gated 113.50 pb^{-1} H1 Data Taken 102.00 pb^{-1}

Integr. Lumi pb^{-1}

Status 05.01.07 at 16:00

July August September October November December

Lumi per day nb^{-1}

Day of the year 2006 0 200 400 600 800 1000

1200

1400

1600

1800

200 220 240 260 280 300 320 340 360