0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

100 120 140 160 180 200 220 240 260 280 300

mass ΜGeVΝ y

H1 preliminary scalar LQ mass 200 GeV NC decay cross section