H1 e^+p preliminary

60

80

100

120

140

60 70 80 90 100 110 120 130 140

m(χ_1^0) (GeV) m(e^~) (GeV) theoretically inaccessible

χ_1^0 not NLSP

λ^, _{1j1}= 0.5 λ^, _{1j1}=1.0 λ^, _{1j1}=1.5

OPAL

tanβ = 2

tanβ = 1.5, μ Λ 0, N = 2

GMSB, j=1,2