H1 Preliminary 1994

F^~_2^D F^~_2^{IP}

Q^2 = 2.5 GeV^2

F^~_2^D β = 0.01

F^~_2^D

Q^2 = 3.5 GeV^2

β = 0.04 Q^2 = 5 GeV^2

β = 0.1 Q^2 = 8.5 GeV^2

β = 0.2 Q^2 = 12 GeV^2

β = 0.4 Q^2 = 20 GeV^2

β = 0.65 Q^2 = 35 GeV^2

β = 0.9

Q^2 / GeV^2

Q^2 = 65 GeV^2 β

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2

0

0.25

10^{-2} 10^{-1} 1

0

0.25

1 10 10^2 0

0.25

10^{-2} 10^{-1} 1