Searches for squarks in R_P viol. SUSY

0

20

40

60

80

100

120

140

160

180

0 50 100 150 200 250 300 350

not allowed

200 GeV

260 GeV m(q^∼)=275 GeV tan β=6 , μ < 0, A_0 = 0

H1 preliminary^{mSUGRA, j=1,2}

excluded for λ^, _{1j1} = 0.3

m_0 (GeV) m_{1/2} (GeV)

D0 limit