0 50 100 150 200 250 300 350

0 0.2 0.4 0.6 0.8 0 50 100 150 200 250 300 350 400 450

-2.6 -2.4 -2.2 -2

10

10^2

H1 Diffractive D^*, x_{IP}Λ0.01

z_{IP} dσ/dz_{IP} ΜpbΝ

H1 99-00 (prel.) NLO QCD (H1 fit 2002) 2gluon (CCFM)

log_{10}x_{IP} dσ/dlog_{10}x_{IP} ΜpbΝ p_{T,D*} ΜGeVΝ dσ/dp_{T,D*} Μpb/GeVΝ

2 5 10 η_{D*} dσ/dη_{D*} ΜpbΝ

0 20 40 60 80 100 120 140

-1 0 1