0 100 200 300 400 500 600 700

-2.6 -2.4 -2.2 -2 -1.8 -1.6 -1.4 log_{10}x_{IP} dσ/dlog_{10}x_{IP} ΜpbΝ

H1 Diffractive D^*

H1 99-00 (prel.) NLO QCD (H1 fit 2002) RAPGAP MC (H1 fit 2002)