0.6

0.8

1

1.2

1.4

1.6

0 0.25 0.5 0.75 1 1.25 1.5

ΒtΒ ΜGeV^2Ν α_P(t)

H1: γp 5 J/ψp

Fit: α_0+α′⋅t α_0 = 1.20Α0.02 α′ = (0.15Α0.06) GeV^{-2}

ZEUS

H1 99-00 J/ψ 5 μ^+μ^- (prelim.)