2 2.5 3 3.5 4 4.5 5 5.5 6 6.5

10^2

50 100

W ΜGeVΝ b(W) ΜGeV^{-2}Ν

H1: γp 5 J/ψp

Fit: b_0+4α′⋅ln(W/90 GeV) b_0 = (4.73Α0.12) GeV^{-2} α′ = (0.19Α0.08) GeV^{-2}

ZEUS

H1 99-00 J/ψ 5 μ^+μ^- (prelim.)