Registration for the Spring-Meeting of the

German Physical Society

from 04.03. to 09.03.2005 in berlinhkt

Measurement of the neutral current ep cross section using longitudinally polarised positron beam at HERA II — •Andrei Nikiforov and Vladimir Chekelian for the collaboration — Max- Planck-Institut für Physik, München, Germany

Data taken with the H1 detector, for longitudinally polarised positrons in left and right handed states in collision with unpolarised protons at HERA, are used to measure the cross sections for e^+p neutral current deep inelastic scattering at a center-of-mass energy of √ s = 319 GeV.

The measured cross sections are compared with the predictions of the Standart Model.

Location: berlinhkt Date: 04.03.—09.03.2005 Section: Particle Physics Subject: Structure functions Presentation: Talk Email: nikifor@mail.desy.de Membership: none