EPS-HEP99 Abstract # 000 Parallel sessions: 5 Plenary sessions: 5

Measurement of Open Beauty Production at HERA

H1 Collaboration, DESY, Notkestr.85, D-22607 Hamburg, Germany

Several methods for extracting b-quark enriched event samples from the data collected by the H1 detector at HERA are presented, utilising the semi-muonic b-quark decays. The bb̄ cross section is measured at photon-proton centre-of-mass energies around √s_{γp} = 200 GeV. The result is found to be significantly above the cross section expected from QCD calculations.