\documentstyle[12pt,hep99]{article}
\begin{document}

\begin{flushright}
{\bf EPS-HEP99} \\
{\bf Abstract \# 000} \\
{\bf Parallel sessions: 3} \\
{\bf Plenary sessions:  3}
\end{flushright}
\abstractheader{ {\bf 
\boldmath Measurement of elastic $\omega$ photoproduction at HERA  } \\ \\
H1 Collaboration, \\
DESY, Notkestr.85, D-22607 Hamburg, Germany
}

\abstractbody{
The reaction $\gamma p \rightarrow \omega p$ ($\omega \rightarrow
\pi^0 \gamma$ and $\pi^0 \rightarrow \gamma \gamma$) is studied 
at photon-proton centre-of-mass energies around
$200 {\rm\ GeV}$ using the H1 detector at HERA.
Measurements are presented of the 
photon-proton cross section for elastic $\omega$ production
and of the differential cross section ${\rm d}\sigma/{\rm d}|t|$.
The $t$-dependence is found to follow an exponential distribution
of the form ${\rm d}\sigma/{\rm d}|t| \propto \exp{-b|t|}$. 
The slope parameter $b$ is determined and is compared with the
measurements of other elastic meson production processes.
}
\end{document}
