H1 1994

Q^2=4.5GeV^2

(a) Quarks Only (Fit 1)

x_{IP} F_2^{D(3)}(x_{IP}=0.003)

Q^2=4.5GeV^2

(b) Quarks + Gluons (Fit 3)

Q^2=7.5GeV^2 Total Pomeron

Q^2=7.5GeV^2

x_{IP} F_2^{D(3)}(x_{IP}=0.003)

Q^2=9GeV^2 Q^2=9GeV^2

Q^2=12GeV^2 Q^2=12GeV^2

Q^2=18GeV^2 Q^2=18GeV^2

Q^2=28GeV^2 Q^2=28GeV^2

Q^2=45GeV^2 Q^2=45GeV^2

Q^2=75GeV^2

β

Q^2=75GeV^2

β

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1

0 0.05

0 0.2 0.4 0.6 0.8 1 0 0.05

0 0.2 0.4 0.6 0.8 1