0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

H1 Preliminary

β n

Errors Stat+Sys(M/C) 0.0Λ p_t^{thrust} Λ 0.8 GeV 0.8Λ p_t^{thrust} Λ 1.7 GeV 1.7Λ p_t^{thrust} Λ 4.0 GeV