Δη

Gap Fraction f(Δη)

Herwig without colour singlet exchange

H1 Data

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1

0.2

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4