H1(94,95,96),NMC,BCDMS

0

5

10

15

20

25

30

35

10^{-4} 10^{-3} 10^{-2} x xg(x,Q^2)

H1 preliminary

Q^2 = 20 GeV^2

Q^2 = 5 GeV^2 α_s(M_Z^2)=0.118±0.05 m_c=1.5±0.3GeV