A events (p_⊥^{had}Γ 12.5 GeV/c) selected events CC Monte-Carlo γp events γp Monte-Carlo

0

20

40

60

80

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1