η^*

1/N dn/dη^*

PHOJET CDM

H1 ΛQ^2Γ=16 GeV^2 H1 ΛQ^2Γ=0 GeV^2 H1 Preliminary ΛQ^2Γ=16 GeV^2 H1 Preliminary ΛQ^2Γ=0 GeV^2 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

-0.5 0 0.5 1 1.5 2 2.5 3 3.5