H1 Preliminary

1/N dN/df

Q^2=0 GeV^2

H1 data HERWIG DG

LEPTO

0.65 < Q^2 < 1.2 GeV^2 1.2 < Q^2 < 2.6 GeV^2

2.6 < Q^2 < 4 GeV^2 4 < Q^2 < 9 GeV^2 9 < Q^2 < 20 GeV^2

20 < Q^2 < 25 GeV^2 25 < Q^2 < 36 GeV^2 36 < Q^2 < 49 GeV^2

f

0

0.05

0.1

0 0.5 1 1.5 0 0.2 0.4 0.6 0.8

0 0.5 1 0 0.2 0.4 0.6 0.8

0 0.5 1

0 0.2 0.4 0.6 0.8

0 0.5 1 0 0.2 0.4 0.6 0.8

0 0.5 1 0 0.2 0.4 0.6 0.8

0 0.5 1

0 0.2 0.4 0.6 0.8

0 0.5 1 0 0.2 0.4 0.6 0.8

0 0.5 1 0 0.2 0.4 0.6 0.8

0 0.5 1