log x xg(x)

H1 95 D^* preliminary

H1 95/96 F_2 prelimin.

3 Flavour, M S

μ^2=25 GeV^2/c^2

CTEQ4F3

D^* syst. error total theor. 0

10

20

-4 -3 -2 -1 0