0

2

4

6

8

10^{-2} 10^{-1} ξ ξg(ξ,Q^2)

H1 Preliminary Q^2= 100 GeV^2 envelope of Q^2 _{mid} fits y_{cut}

ξg=A_Nξ^α(1-ξ)^β(1+γξ)