KNO Distribution - H1 Preliminary

Z = n/ΛnΓ

Ψ =ΛnΓ . P(n)

12ΛQ^2Λ30 GeV^2 30ΛQ^2Λ80 GeV^2 200ΛQ^2Λ500 GeV^2

10^{-3}

10^{-2}

10^{-1}

1

0 1 2 3 4 5 6