E_T (GeV)

1/N dN/dE_T (1/GeV) x = 0.00031

Q^2 = 7 GeV^2 Q^2 = 13 GeV^2

E_T (GeV)

1/N dN/dE_T (1/GeV) x = 0.0021

Q^2 = 15 GeV^2 Q^2 = 65 GeV^2

E_T (GeV)

1/N dN/dE_T (1/GeV)

Q^2 = 14 GeV^2

x = 0.00036 x = 0.0023

E_T (GeV)

1/N dN/dE_T (1/GeV)

Q^2 = 31 GeV^2

x = 0.00093 x = 0.0047

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 10 20

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 10 20

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 10 20

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 10 20