x_L dσγp/dxL [μb] ρ^0 with Forward Neutrons

0.4 0.5 0.6 0.7 0.8 0.9 0 0.2 0.4 0.6 0.8 1 H1 data (prel.)

Normalised to data:

0

1

FMS NSSS

H1 Preliminary