0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

200 400 600 800 1000 1200

E_n (GeV) arbitrary units

H1 Preliminary POMPYT PYTHIA (mult.interact.) PYTHIA (no mult.interact.)