10^{-1}

1

10

10^2

5 10 15 20

H1 Preliminary

BH + DVCS (FFS) BHBH 30 < W < 120 GeV Β t Β < 1 GeV^2

Q^2 [ GeV^2 ] dσ/dQ^2 [ pb/GeV^2 ]