H1 Preliminary

BH + DVCS (FFS) BHBH 4 < Q^2 < 20 GeV^2 Β t Β < 1 GeV^2

W [ GeV ] dσ/dW [ pb/GeV ]

0

0.5

1.0

40 60 80 100 120