0 0.025

0.05

0.075 0.1

40 60 80

P_T [GeV]

1/N_{DIS} dN_{DIS}/dP_T

H1 Charged Current CC ARIADNE H1 Neutral Current NC ARIADNE

10^{-2}

10^{-1}

1

2 3 4

log_{10}(Q^2/GeV^2)

1/N_{DIS} dN_{DIS}/dlog_{10}(Q^2)

0 2.5 5 7.5 10

0 0.1 0.2 0.3 0.4

1/N_{DIS} dN_{DIS}/dx

0

1

2

3

0 0.2 0.4 0.6 0.8 1 y

1/N_{DIS} dN_{DIS}/dy

H1 preliminary