0

0.2

0.4

0.6

0.8

1

10^3 10^4

R_1(Q^2)

H1 Charged Current H1 Neutral Current CC ARIADNE NC ARIADNE

0

0.1

0.2

0.3

10^3 10^4

R_2(Q^2)

0

0.01

0.02

0.03

0.04

10^3 10^4

Q^2 [GeV^2]

R_3(Q^2)

H1 preliminary