1

10

0.01 0.02 0.03 0.04 0.05

y_2

1/σ_{DIS} dσ_{dijet}/dy_2

H1 Charged Current ARIADNE LEPTO HERWIG RAPGAP

10^{-4}

10^{-3}

25 50 75 100

m_{12} [GeV]

1/σ_{DIS} dσ_{dijet}/dm_{12}

0 0.25 0.5 0.75 1

0 0.1 0.2 0.3 0.4 0.5

z_p

1/σ_{DIS} dσ_{dijet}/dz_p

10^{-1}

0 0.2 0.4 0.6 0.8 1

x_p

1/σ_{DIS} dσ_{dijet}/dx_p

0

0.005

0.01

20 40 60 80

E_{T,fwd} [GeV]

1/σ_{DIS} dσ_{dijet}/dE_{T,fwd}

0

0.005

0.01

0.015

20 40 60 80

θ_{fwd} [^o]

1/σ_{DIS} dσ_{dijet}/dθ_{fwd}

ΘΠ^{statistical full error}

H1 preliminary

5

5