10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

20 40 60 80 100 120

m_{12} [GeV]

1/σ_{DIS} dσ_{dijet}/dm_{12}

Q^2 Γ 5 000 GeV^2

( Ξ 1/100 )

H1 Charged Current

Q^2 Γ 5 000 GeV^2 ( Ξ 1/100 )

H1 Neutral Current NLO MEPJET CC NLO DISENT NC NLO uncertainty NC

H1 preliminary

5