modified Durham algorithm, y_2 Γ 0.001

0

0.005

0 50 100

150 Λ Q^2 Λ 275 GeV^2

0

0.002

0 50 100

0 0.005

0.01

0 50 100

275 Λ Q^2 Λ 575 GeV^2

0 0.002

0.004

0 50 100

0

0.01

0.02

0 50 100

1/σ_{DIS} dσ/dθ_{fw}

575 Λ Q^2 Λ 5000 GeV^2

0 0.0025

0.005

0 50 100

1/σ_{DIS} dσ/dθ_{bw}

0

0.02

0 50 100

5000 Λ Q^2 Λ 10000 GeV^2

0 0.005

0.01

0 50 100

0

0.02

0.04

0 50 100

θ_{fw}Μ^oΝ

Q^2 Γ 10000 GeV^2

0

0.01

0 50 100

θ_{bw}Μ^oΝ

H1 preliminary data NLO + hadronization hadronization and scale uncertainty

ARIADNE LEPTO