modified Durham algorithm, y_2 Γ 0.001

0

0.5

1

0 0.1 0.2 0.3 0.4 0.5

0 0.25 0.5

0 0.2 0.4 0.6 0.8 1

150 Λ Q^2 Λ 275 GeV^2

0 0.5 1

0 0.1 0.2 0.3 0.4 0.5

0 0.25 0.5

0 0.2 0.4 0.6 0.8 1

275 Λ Q^2 Λ 575 GeV^2

0 0.5 1

0 0.1 0.2 0.3 0.4 0.5

1/σ_{DIS} dσ/dz_p

0

0.5

1

0 0.2 0.4 0.6 0.8 1

1/σ_{DIS} dσ/dx_p

575 Λ Q^2 Λ 5000 GeV^2

0

1

0 0.1 0.2 0.3 0.4 0.5

0 1 2

0 0.2 0.4 0.6 0.8 1

5000 Λ Q^2 Λ 10000 GeV^2

0

1

2

0 0.1 0.2 0.3 0.4 0.5

z_p 0

2

0 0.2 0.4 0.6 0.8 1

x_p

Q^2 Γ 10000 GeV^2

H1 preliminary data NLO + hadronization hadronization and scale uncertainty

ARIADNE LEPTO