0

2

4

6

8

10

0.1 0.11 0.12 0.13 0.14 0.15 α_s(M_Z) x G(x, μ^2_f=200GeV^2)

H1 preliminary

correlation: α_s − gluon density in a simultaneous NLO QCD fit

x = 0.01

x = 0.02

x = 0.04

x = 0.1

H1 jet data Δχ^2=1

CTEQ5M1 MRST99 GRV98 Botje99