H1 preliminary

2 3 4 5 6 7 8 9 10

20 30

1 10 10^2

F_2

Q^2/GeV^2

x=5E-05

(x 23)

x=8E-05

(x 17)

x=0.00013

(x 12)

x=0.0002

(x 8.5)

x=0.00032

(x 6)

x=0.0005

(x 4)

x=0.0008

(x 3)

H1 96-97 low x prel.

Fit (H1) Q^{2min}=1.5 GeV^2 Fit (H1) Q^{2min}=2.5 GeV^2 Fit (H1) Q^{2min}=3.5 GeV^2 Fit (H1) Q^{2min}=5.0 GeV^2