0 50 100 150 200 250 300 350 400

10^{-1} 1

Q^2Γ1000 GeV^2, yΛ0.9

Charged Current H1 e^−p preliminary

H1 e^+p

x dσ_{CC}/dx / pb

Standard Model (H1 e^+p QCD Fit)

SM e^+p Ρs=320 GeV