P_T ^{jet} (GeV) arbitrary units

EPVEC

ANOTOP

θ_{jet} < 35°

P_T ^{jet} (GeV) arbitrary units

EPVEC

ANOTOP

θ_{jet} > 35°

0

0.05

0.1

0 20 40 60 80 100 0

0.1

0.2

0 20 40 60 80 100