Determination of the Upper Limit

Nobserved = 13 Nbackground = 4 Confidence Level = 95% Systematic Uncertainty = 24.5% + Nlimit = 22 Result: Upper limit on σ on a 95% CL:

σ γp O!π^0N^{� < 39 nb (H1 preliminary)} σ γp O!π^0N^{� = 400 nb (MSV prediction)}

Model of the Stochastic Vacuum

restricted to the visible t range: 0.02 GeV^2 < t < 0.3 GeV^2 0.3 < y < 0.7 and Q^2 < 0.01 GeV^2 W_{flp} ß 210 GeV neutron tagged and extrapolated via Clebsch Gordan formalism