Efficiency e μ P^X_T > 0 GeV 0.44 0.15 P^X_T > 12 GeV 0.40 0.39 P^X_T > 25 GeV 0.39 0.49 P^X_T > 40 GeV 0.39 0.53

Table 3: Efficiencies of the final selection for W decay in the electron and muon channels as a function of the P^X_T requirement. These efficiencies were calculated with the EPVEC generator.